Signs You Need to Look into Stucco Remediation

Porous stucco is prone to absorbing moisture. The problem is that this often goes unnoticed by homeowners, giving it time to fester and do extensive damage to homes. Stucco looks beautiful, but the hidden trouble that’s often brewing beneath the surface can lead to structural damage. How do you know if your stucco needs attention? […]