Stucco Repair vs. Remediation

When stucco isn’t installed properly, small cracks and its porous nature cause it to absorb water. This leads to damage like mold, rot, and structural issues. If your stucco is showing signs of moisture problems, it’s important to address them promptly. The longer they are left, the bigger and more costly they become.  If you’ve […]